X-Git-Url: https://git.rvb.name/weathermon.git/blobdiff_plain/e4e1557426f8e5ca10ca616140528939d86426cd..67f3d398664cc319615339c1ce9c525e672c332f:/mysql/meteo_units.sql

diff --git a/mysql/meteo_units.sql b/mysql/meteo_units.sql
index 110b39d..76d81aa 100644
--- a/mysql/meteo_units.sql
+++ b/mysql/meteo_units.sql
@@ -27,6 +27,7 @@ CREATE TABLE `units` (
   `name` varchar(32) CHARACTER SET utf8 NOT NULL,
   `name_short` varchar(8) CHARACTER SET utf8 NOT NULL,
   `unit_group` int(11) NOT NULL,
+  `prec` int(11) DEFAULT NULL,
   PRIMARY KEY (`id`),
   KEY `fk_units_group_idx` (`unit_group`),
   CONSTRAINT `fk_units_group` FOREIGN KEY (`unit_group`) REFERENCES `unit_groups` (`id`) ON DELETE NO ACTION ON UPDATE NO ACTION
