X-Git-Url: https://git.rvb.name/weathermon.git/blobdiff_plain/b9870da67ab44b1dbba4a9f5467b0aeaa2fb3e4f..c58ad4fb6f2c4c350a6aae01b100ebb4564ad8e9:/mysql/meteo_sensors.sql?ds=sidebyside

diff --git a/mysql/meteo_sensors.sql b/mysql/meteo_sensors.sql
index 6b17ae1..17441ae 100644
--- a/mysql/meteo_sensors.sql
+++ b/mysql/meteo_sensors.sql
@@ -1,10 +1,8 @@
-CREATE DATABASE  IF NOT EXISTS `meteo` /*!40100 DEFAULT CHARACTER SET utf8 */;
-USE `meteo`;
--- MySQL dump 10.13  Distrib 5.5.35, for debian-linux-gnu (i686)
+-- MySQL dump 10.13  Distrib 5.5.38, for debian-linux-gnu (x86_64)
 --
--- Host: estia    Database: meteo
+-- Host: localhost    Database: meteo
 -- ------------------------------------------------------
--- Server version	5.5.35-0ubuntu0.13.10.2
+-- Server version	5.5.38-0ubuntu0.14.04.1
 
 /*!40101 SET @OLD_CHARACTER_SET_CLIENT=@@CHARACTER_SET_CLIENT */;
 /*!40101 SET @OLD_CHARACTER_SET_RESULTS=@@CHARACTER_SET_RESULTS */;
@@ -35,16 +33,6 @@ CREATE TABLE `sensors` (
   CONSTRAINT `fk_sensors_st` FOREIGN KEY (`st_id`) REFERENCES `sensor_types` (`id`) ON DELETE NO ACTION ON UPDATE NO ACTION
 ) ENGINE=InnoDB AUTO_INCREMENT=4 DEFAULT CHARSET=latin1;
 /*!40101 SET character_set_client = @saved_cs_client */;
-
---
--- Dumping data for table `sensors`
---
-
-LOCK TABLES `sensors` WRITE;
-/*!40000 ALTER TABLE `sensors` DISABLE KEYS */;
-INSERT INTO `sensors` VALUES (1,1,'DEFAULT','ÐÐ¾Ð¼Ð½Ð°ÑÐ°'),(2,2,'44F','Ð£Ð»Ð¸ÑÐ°'),(3,3,'DEFAULT','ÐÐ¾Ð¼Ð½Ð°ÑÐ°');
-/*!40000 ALTER TABLE `sensors` ENABLE KEYS */;
-UNLOCK TABLES;
 /*!40103 SET TIME_ZONE=@OLD_TIME_ZONE */;
 
 /*!40101 SET SQL_MODE=@OLD_SQL_MODE */;
@@ -55,4 +43,4 @@ UNLOCK TABLES;
 /*!40101 SET COLLATION_CONNECTION=@OLD_COLLATION_CONNECTION */;
 /*!40111 SET SQL_NOTES=@OLD_SQL_NOTES */;
 
--- Dump completed on 2014-03-17 20:31:46
+-- Dump completed on 2014-09-25 14:47:17
