X-Git-Url: https://git.rvb.name/weathermon.git/blobdiff_plain/3fd934fc66956e08777aaa10bd2ee27c1bc62758..888e7fac57439dbb42864d77122a4cf551889477:/mysql/tmp_sensor_values.sql?ds=inline

diff --git a/mysql/tmp_sensor_values.sql b/mysql/tmp_sensor_values.sql
new file mode 100644
index 0000000..696c073
--- /dev/null
+++ b/mysql/tmp_sensor_values.sql
@@ -0,0 +1,8 @@
+CREATE TABLE `tmp_sensor_values` (
+  `id` int(11) NOT NULL DEFAULT '0',
+  `sensor_id` int(11) NOT NULL,
+  `timestamp` datetime NOT NULL,
+  `value` float NOT NULL,
+  `parameter_id` int(11) NOT NULL,
+  `reduced` int(11) DEFAULT '0'
+) ENGINE=InnoDB DEFAULT CHARSET=utf8;
