X-Git-Url: https://git.rvb.name/weathermon.git/blobdiff_plain/1c313340ae25561c78754b02272798905a8a31cd..48c48c6c4bb57ffccf8ee85e539c65576f053b61:/mysql/meteo_unit_conv.sql

diff --git a/mysql/meteo_unit_conv.sql b/mysql/meteo_unit_conv.sql
index f58fa83..4ac573a 100644
--- a/mysql/meteo_unit_conv.sql
+++ b/mysql/meteo_unit_conv.sql
@@ -1,10 +1,8 @@
-CREATE DATABASE  IF NOT EXISTS `meteo` /*!40100 DEFAULT CHARACTER SET utf8 */;
-USE `meteo`;
--- MySQL dump 10.13  Distrib 5.5.35, for debian-linux-gnu (i686)
+-- MySQL dump 10.13  Distrib 5.5.38, for debian-linux-gnu (x86_64)
 --
--- Host: estia    Database: meteo
+-- Host: localhost    Database: meteo
 -- ------------------------------------------------------
--- Server version	5.5.35-0ubuntu0.13.10.2
+-- Server version	5.5.38-0ubuntu0.14.04.1
 
 /*!40101 SET @OLD_CHARACTER_SET_CLIENT=@@CHARACTER_SET_CLIENT */;
 /*!40101 SET @OLD_CHARACTER_SET_RESULTS=@@CHARACTER_SET_RESULTS */;
@@ -54,4 +52,4 @@ UNLOCK TABLES;
 /*!40101 SET COLLATION_CONNECTION=@OLD_COLLATION_CONNECTION */;
 /*!40111 SET SQL_NOTES=@OLD_SQL_NOTES */;
 
--- Dump completed on 2014-03-17 20:31:31
+-- Dump completed on 2014-09-25 14:49:01
